C Library Functions kva_match (3)

NAME kva_match - look up a key in a key-value array

SYNOPSIS cc [ flag ... ] file ... - lsecdb [ library ... ] #include <secdb.h> char *kva_match(kva_t *kva, char * key);

DESCRIPTION The kva_match( ) function is used to search a kva_t structure, which is part of the authattr_t , execattr_t , profattr_t , or userattr_t structures. The function takes two arguments: a pointer to a key value array, and a key. If the key is in the array, the function returns a pointer to the first corresponding value that matches that key. Otherwise, the function returns a NULL.

RETURN VALUES Upon success, the function returns a pointer to the value sought. Otherwise, it returns a NULL.

ATTRIBUTES See attributes (5) for descriptions of the following attributes:

ATTRIBUTE TYPE ATTRIBUTE VALUE MT-Level MT-Safe.

SEE ALSO getauthattr (3), getexecattr (3), getprofattr (3), and getuserattr (3)

NOTES kva_match( ) returns a pointer to data that already exists in the key-value array. It does not allocate its own memory for this pointer but obtains it from the key-value array that is passed as its first argument.

modified 10 Mar 1999 SunOS 5.7 3-1